Time [min]

3760 3780 3800 3820 3840 3860 3880

Idd [mA]

50 60 70 80 90 100 110 120 AnZ38850-W12-X07-Y05 Temp = 100 deg. C

Temp = 30 deg.C

Temp = 30, Vdd=4V